<!-- START OF STANDARD FOOTER-->
</td>
</tr></table>
<!-- end body text -->

<!-- footer -->
<br />
<table cellpadding="0" cellspacing="0" border="0" width="98%" summary="footer">
<tr><td bgcolor="#0099cc" colspan="2"><img
src="http://www.cl.cam.ac.uk/UoCCL/images/pixel.gif" class="block" width="1" height="4" border="0" alt="" /></td>
</tr>
<tr><td bgcolor="#cccccc" colspan="2"><img
src="http://www.cl.cam.ac.uk/UoCCL/images/pixel.gif" class="block" width="1" height="2" border="0" alt="" /></td>
</tr>

<tr><td>
<div class="footer">
<!--Add Department name and email contact here-->
<p>&copy; 2002 Computer Laboratory, University of Cambridge<br />
Please send any comments to ##COMMENTCONTACT##<br />
Page last updated ##DATE## by ##OWNERNAME##</p>
</div>
</td>
</tr>
</table>

<!--  end footer -->
</body>
</html>
