\documentclass{llncs}
\usepackage{graphicx} %for \includegraphics
\begin{document}

\title{ARM Project 2004: Final Report}

\author{Name Surname (CRSID)}

\institute{University of Cambridge, Department of Engineering}

\maketitle




\section{Introduction}

About 0.5 pages.

Being able to make sense of Latex, at least at a superficial level, is
a useful asset for an engineer, scientist or programmer. Most
scientific journals and conferences require submissions in this
format. 

If you wish to include a png or jpg picture, you may use the
``figure'' environment and the ``includegraphics'' statement in the
following way. 

\begin{figure}
\begin{center}
\includegraphics[width=50mm]{dialogbox}
\end{center}
\caption{One of the dialog boxes I used.}
\end{figure}

Note that, in some cases, the figure may not appear on the page you
expect.

\section{Weekly tasks}

About 0.5--1 pages per task.

\subsection{Electronic Dice in Verilog}

\subsection{String sort in ARM assembler}

When you talk about your code, if needed you may include a brief
source fragment in your Latex document using the ``verbatim''
environment in the following way.

\begin{verbatim}
loop
                ldrb    r0, [r4], #1    ; Get next character.
                cmp     r0, #0          ; Stop when we hit a null.
                beq     print
                bl      putchar
                b       loop 
\end{verbatim}



\subsection{Mouse interface in Verilog}

\subsection{Reading the mouse from the ARM}

\section{Challenges and lessons learned}

About 1--2 pages.

Real addicts find perverse pleasure in writing \LaTeX{} (or, failing
that, LaTeX) instead of Latex.

\section{Conclusions}

About 0.5 pages.

Do not exceed a maximum of 7 pages for the whole report.

\end{document}
